From 263787bae1d698ebc7aa9cc6581b69d258dcca7d Mon Sep 17 00:00:00 2001
From: xengineering <me@xengineering.eu>
Date: Sat, 12 Oct 2024 13:02:58 +0200
Subject: doc: Fix quote characters
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

LaTeX used to convert `'` quotes to a `’` even in verbatim environments.
This is unsuitable to copy commands from the documentation to the Linux
command line interface.

Since this use case is very important to use the documentation this has
to be fixed. Using the `upquote` package is sufficient to prevent the
conversion.
---
 doc/documentation.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'doc/documentation.tex')

diff --git a/doc/documentation.tex b/doc/documentation.tex
index 885b215..b2f912b 100644
--- a/doc/documentation.tex
+++ b/doc/documentation.tex
@@ -8,6 +8,7 @@
 \usepackage{array}
 \usepackage{hyperref}
 \usepackage{parskip}
+\usepackage{upquote}
 
 \begin{document}
 
-- 
cgit v1.2.3-70-g09d2

