From 334d6b69204d0acca740da7ff14a28b937c2328d Mon Sep 17 00:00:00 2001
From: xengineering <me@xengineering.eu>
Date: Thu, 26 Sep 2024 21:53:21 +0200
Subject: doc: Rename last section to "License"

It used to be named by the chosen license. To make the structure of the
document more generic it should only be named "License".
---
 doc/documentation.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'doc/documentation.tex')

diff --git a/doc/documentation.tex b/doc/documentation.tex
index 797689b..14dce3e 100644
--- a/doc/documentation.tex
+++ b/doc/documentation.tex
@@ -31,7 +31,7 @@ Using multiple devices allows to build up a multi-room audio setup.
 
 This project is Open
 Hardware\footnote{\href{https://en.wikipedia.org/wiki/Open-source\_hardware}{https://en.wikipedia.org/wiki/Open-source\_hardware}}
-and licensed under the CERN Open Hardware License S (see \autoref{cern-ohl-s}).
+and licensed under the CERN Open Hardware License S (see \autoref{license}).
 
 \section{Current state}
 
@@ -437,7 +437,7 @@ Versioning\footnote{\href{https://semver.org/spec/v2.0.0.html}{https://semver.or
 	\item operating system resist power cut without any risk
 \end{itemize}
 
-\chapter{CERN Open Hardware Licence}\label{cern-ohl-s}
+\chapter{License}\label{license}
 
 \texttt{\input{../LICENSE.txt}}
 
-- 
cgit v1.2.3-70-g09d2

