From 6fe267f08b0f1cd277f2578951bae6a088c77a8d Mon Sep 17 00:00:00 2001
From: xengineering <me@xengineering.eu>
Date: Thu, 26 Sep 2024 21:38:43 +0200
Subject: doc: Add changelog to appendix

---
 doc/documentation.tex | 19 +++++++++++++++++++
 1 file changed, 19 insertions(+)

(limited to 'doc/documentation.tex')

diff --git a/doc/documentation.tex b/doc/documentation.tex
index e0316f5..48dc76e 100644
--- a/doc/documentation.tex
+++ b/doc/documentation.tex
@@ -418,6 +418,25 @@ devices or to care about the software internals.
 
 \appendix
 
+\chapter{Changelog}\label{changelog}
+
+All notable changes to \texttt{soundbox} will be documented here.
+\texttt{soundbox} adheres to Semantic
+Versioning\footnote{\href{https://semver.org/spec/v2.0.0.html}{https://semver.org/spec/v2.0.0.html}}.
+
+\section{0.1.0 - 2024-02-02}
+
+\href{https://cgit.xengineering.eu/soundbox/tag/?h=0.1.0}{https://cgit.xengineering.eu/soundbox/tag/?h=0.1.0}
+
+\subsection{Added}
+
+\begin{itemize}
+	\item soundbox device with 3D-printed case
+	\item lossless WLAN-based multi-room audio streaming
+	\item network discovery based on the LLDP protocol
+	\item operating system resist power cut without any risk
+\end{itemize}
+
 \chapter{CERN Open Hardware Licence}\label{cern-ohl-s}
 
 \texttt{\input{../LICENSE.txt}}
-- 
cgit v1.2.3-70-g09d2

