From c0d25407c8e1b4fba828ac4eec5e2b79372692de Mon Sep 17 00:00:00 2001
From: xengineering <me@xengineering.eu>
Date: Sat, 12 Oct 2024 13:22:39 +0200
Subject: doc: Fix and rework source links in changelog

The release 0.2.0 had a bad link. Furthermore the prefix `Source code: `
was added to the source URLs.
---
 doc/documentation.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'doc/documentation.tex')

diff --git a/doc/documentation.tex b/doc/documentation.tex
index f279aab..4f14b14 100644
--- a/doc/documentation.tex
+++ b/doc/documentation.tex
@@ -458,7 +458,7 @@ Versioning\footnote{\href{https://semver.org/spec/v2.0.0.html}{https://semver.or
 
 \section{0.2.0 - 2024-09-29}
 
-\href{https://cgit.xengineering.eu/soundbox}{https://cgit.xengineering.eu/soundbox}
+Source code: \href{https://cgit.xengineering.eu/soundbox/tag/?h=0.2.0}{https://cgit.xengineering.eu/soundbox/tag/?h=0.2.0}
 
 \paragraph{Added}
 
@@ -481,7 +481,7 @@ Versioning\footnote{\href{https://semver.org/spec/v2.0.0.html}{https://semver.or
 
 \section{0.1.0 - 2024-02-02}
 
-\href{https://cgit.xengineering.eu/soundbox/tag/?h=0.1.0}{https://cgit.xengineering.eu/soundbox/tag/?h=0.1.0}
+Source code: \href{https://cgit.xengineering.eu/soundbox/tag/?h=0.1.0}{https://cgit.xengineering.eu/soundbox/tag/?h=0.1.0}
 
 \paragraph{Added}
 
-- 
cgit v1.2.3-70-g09d2

