From c2d8261aba307223d3f1edce3a88a4d212395e4a Mon Sep 17 00:00:00 2001
From: xengineering <me@xengineering.eu>
Date: Thu, 4 Jan 2024 21:35:23 +0100
Subject: doc: Remove 'soundbox-' prefix from doc PDF

Inside the artifacts folder aswell as inside the source folder adding a
'soundbox-' prefix to files is uncommon. In both cases only the root level
folder should contain the name 'soundbox' to remove redundancies.
---
 doc/documentation.tex | 35 +++++++++++++++++++++++++++++++++++
 1 file changed, 35 insertions(+)
 create mode 100644 doc/documentation.tex

(limited to 'doc/documentation.tex')

diff --git a/doc/documentation.tex b/doc/documentation.tex
new file mode 100644
index 0000000..14cf828
--- /dev/null
+++ b/doc/documentation.tex
@@ -0,0 +1,35 @@
+\documentclass{report}
+\author{xengineering}
+\title{soundbox documentation}
+
+\begin{document}
+
+\maketitle
+\newpage
+
+\tableofcontents
+\newpage
+
+\chapter{Introduction}
+
+\texttt{soundbox} is a device to connect classic audio systems to the network.
+
+%\section{Versioning}
+%\section{Licensing}
+
+%\chapter{User guide}
+%\section{Device setup}
+%\section{Playing audio}
+
+%\chapter{Production}
+%\section{Printing mechanical parts}
+%\section{Install operating system to SD card}
+%\section{Final assembly}
+
+%\chapter{Device internals}
+%\section{Mechanical design}
+%\section{Electronics}
+%\section{Operating system}
+%\section{Software}
+
+\end{document}
-- 
cgit v1.2.3-70-g09d2

