From e1acff9b0583e19dec4c27061c4bb4d16fe79d1b Mon Sep 17 00:00:00 2001
From: xengineering <me@xengineering.eu>
Date: Sat, 6 Jan 2024 20:49:03 +0100
Subject: doc: Change paragraph distance

There used to be no extra space between paragraphs which in combination
with no indentation was not useful.
---
 doc/documentation.tex | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'doc/documentation.tex')

diff --git a/doc/documentation.tex b/doc/documentation.tex
index 27fdb76..2576a8a 100644
--- a/doc/documentation.tex
+++ b/doc/documentation.tex
@@ -5,8 +5,7 @@
 \usepackage{graphicx}
 \graphicspath{ {./diagrams/} }
 \usepackage{hyperref}
-
-\setlength\parindent{0pt}
+\usepackage{parskip}
 
 \begin{document}
 
-- 
cgit v1.2.3-70-g09d2

