From c2d8261aba307223d3f1edce3a88a4d212395e4a Mon Sep 17 00:00:00 2001
From: xengineering <me@xengineering.eu>
Date: Thu, 4 Jan 2024 21:35:23 +0100
Subject: doc: Remove 'soundbox-' prefix from doc PDF

Inside the artifacts folder aswell as inside the source folder adding a
'soundbox-' prefix to files is uncommon. In both cases only the root level
folder should contain the name 'soundbox' to remove redundancies.
---
 doc/soundbox-documentation.tex | 35 -----------------------------------
 1 file changed, 35 deletions(-)
 delete mode 100644 doc/soundbox-documentation.tex

(limited to 'doc/soundbox-documentation.tex')

diff --git a/doc/soundbox-documentation.tex b/doc/soundbox-documentation.tex
deleted file mode 100644
index 14cf828..0000000
--- a/doc/soundbox-documentation.tex
+++ /dev/null
@@ -1,35 +0,0 @@
-\documentclass{report}
-\author{xengineering}
-\title{soundbox documentation}
-
-\begin{document}
-
-\maketitle
-\newpage
-
-\tableofcontents
-\newpage
-
-\chapter{Introduction}
-
-\texttt{soundbox} is a device to connect classic audio systems to the network.
-
-%\section{Versioning}
-%\section{Licensing}
-
-%\chapter{User guide}
-%\section{Device setup}
-%\section{Playing audio}
-
-%\chapter{Production}
-%\section{Printing mechanical parts}
-%\section{Install operating system to SD card}
-%\section{Final assembly}
-
-%\chapter{Device internals}
-%\section{Mechanical design}
-%\section{Electronics}
-%\section{Operating system}
-%\section{Software}
-
-\end{document}
-- 
cgit v1.2.3-70-g09d2

